
    SET DATE AND TIME

    You can use this program to reset a host's clock. When you activate
    this program, the window on the following page will appear. The rest
    of this subsection details how to use this window's functionality.


    Fields

    This window contains the following fields:

    Hostnames

    Use this field to specify which hosts in the current pool will have
    their clocks reset. If you are using multiple entries, leave a blank
    between each entry. You can also click on the arrow button to the
    right to bring up a pick list of all currently managed hosts and
    make your selections from there.

    Set time option

    Use these toggles to choose whether the new time setting should be
    based on a specific time (default) or a reference host's clock
    setting.

    Reference Host

    If you set the Set Time Option toggle to Use Reference Host, use
    this field to specify which host's clock setting should be
    referenced for the correct time. You can also click on the arrow
    button to the right to bring up a pick list of all currently managed
    hosts and select one of them.

    This can be any UNIX host, but it can NOT be in the current pool.


    Date

    Time

    If you set the Set Time Option toggle to Use Specified Time, you can
    use these fields to specify the date and time you want. The default
    values are the current date and time. See "TIME FORMATS" on page C-1
    for more details on using these fields.

    Buttons

    This window contains the following buttons:

    Apply

    Once you've made your selections, click on this button to reset the
    clock for all selected hosts' clocks in the current pool. You will
    be prompted to confirm your action.

    Clear Fields

    Click on this button to clear the existing choices in all fields.

    Cancel

    Click on this button to close the window without making any changes.
